0 1 2 3 4 5 6+ Predicted degree 70

80

90

100

% Predictions

Overpredictions Underpredictions Correct

 89.6
 98.2
 93.6
 87.8
 85.5
 83.8
 91.1

9 65 15 5 3 1 3