wire_model                                         Specifies wire models for
                                                   current scope.
 [ -s                       scope ]                  design unit, instance
                                                     /current scope
 [ -tree
    { model_list | none } ]                          Specify wire models in
                                                     current target library or
                                                     "none" /Displays current
                                                     setting
