schematic_options                                  Sets schematic generation
                                                   options for Composer
                                                   schematics.
 [ -hierarchy               hierarchy ]              all, top, integer value
                                                     between 1 and 1024 /all
 [ -sheetsize               sheet ]                  A, B, C, D, E, infinite
                                                     /infinite
 [ -orientation             orientation ]            landscape, portrait
                                                     /landscape
 [ -pinplacement            pin_placement ]          left_right, all
                                                     /left_right
 [ -labelsize               label_size ]             6-20 /10
 [ -rows                    rows ]                   max 256/256
 [ -columns                 columns ]                max 256 /256
 [ -llspacing               line_to_line_spacing ]   min 0.125 /0.125
 [ -lcspacing               line_to_comp_spacing]    min 0.125 /0.125
 [ -density                 density_level ]          0-100 (sparse-dense) /100
 [ -views                   views ]                  schematic, symbol,
                                                     netlist, functional
 [ -schematicview           viewname ]
 [ -functionalview          viewname ]
 [ -netlistview             viewname ]
 [ -symbolview              viewname ]
 [ -dumb                    yes | no ]               /no
