library_options                                    Sets various options for
                                                   Synergy library
                                                   compilation.
 [ -libname                 library_name ]
 [ -destdir                 destination_dir ]
 [ -textmacro               text_macro ]             /SYNTH
 [ -disablefile             disable_file ]
 [ -verilogdir              verilog_directory ]
 [ -verilogfile             verilog_file ]
 [ -extension               extension ]              /.v
 [ -rundir                  run_directory ]          /current directory
 [ -techfile                tech_file ]
 [ -macro                   [ yes | no ]              /no
 [ -merge                   lib_list]                Specifies the library or
                                                     libraries you want to
                                                     merge with the target
                                                     library.
