ignore_init_assign                                 Specifies whether Synergy
                                                   ignores initialization of
                                                   signals and variables.
 { yes | no }                                        /no
 [ -b ]                                              An option used by Synergy
                                                     developers to determine
                                                     which file the constraint
                                                     appears in.
 [ -wire ]                                           Synergy ignores
                                                     initialization of
                                                     signals.
 [ -register ]                                       Synergy ignores
                                                     initialization of
                                                     variables.
