Test Synthesis
--------------
dft_async_event_disable
dft_async_input
dft_clock_system
dft_donot_scan
dft_max_chain_length
dft_methodology
dft_number_chains
dft_scan_insert_mode
dft_scan_io
dft_scan_mode
dft_scan_segment
dft_static_test_mode