set_path                                           Overwrites current search
                                                   path to target, source,
                                                   and symbol libraries and
                                                   design files. Not
                                                   available in 4.4
                                                   compatible Synergy.
 path_list                                           / . ~ "Synergy paths"
                                                     (current directory, home
                                                     directory, path to
                                                     Cadence-supplied
                                                     libraries)
