library                                            Specifies source, symbol,
                                                   target, and macro
                                                   libraries, or displays
                                                   the current library
                                                   settings.
 { -source                  [ lib_list ]             Synergy library or macro
                                                     library for first
                                                     library, macro libraries
                                                     for addtional
                                                     libraries.
   | -symbol                [ lib_list ]             Specifies Synergy library
                                                     to search for symbols of
                                                     cells used in your
                                                     design.
   | -target                [ lib_list ]             Specifies library (ies)
                                                     your design is mapped to
                                                     during optimization.
   | -libcomp               [ lib_name ]             Specifies name you want
                                                     given to the target
                                                     library (ies) you are
                                                     going to compile.
   | -macro                 [ lib_list ] }           Specifies macro library
                                                     (ies) to use in your
                                                     design.
