import_constraints                                  Directs Synergy to read
                                                   back a selected module's
                                                   derived constraints for
                                                   reoptimization.
 [run directory]                                     Specifies the run
                                                     directory from which
                                                     previous constraints are
                                                     taken for
                                                     reoptimization.



