ignore_init_assign                                 Specifies whether Synergy
                                                   ignores initialization of
                                                   registers.
 { yes | no }                                        /no
 [ -b ]                                              An option used by Synergy
                                                     developers to determine
                                                     which file the constraint
                                                     appears in.
