dft_number_chains                                  Limits the number of scan
                                                   chains created at the
                                                   scope.
 [ tree ]                                            Applies the constraint to
                                                     all levels of hierarchy
                                                     below the object(s)
                                                     specified.
 [ -scope ]                 scope                    module / current scope
 number                                              positive integer
