dft_methodology                                    Determines the type of
                                                   scan path used to
                                                   implement your design.
 [ tree ]                                            Applies the constraint to
                                                     all levels of hierarchy
                                                     below the object(s)
                                                     specified.
 [ -scope ]                 scope                    module / current scope
 methodology                                         edge_sensitive_scan_path,
                                                     two_phase_scan_path
