dft_donot_scan                                     Specifies objects you do
                                                   not want included in the
                                                   scan chain.
 [ -scope ]                 scope                    module / current scope
 object_list                                         register
                                                     wire
                                                     named block
                                                     instance_name/chain_
                                                     id_number
