concept_sch_options                                Sets schematic generation
                                                   options for Concept
                                                   schematics.
 [ -pinplacement            pin_placement ]          left_right, all
                                                     /left_right
 [ -density                 density_level ]          0-100 (sparse-dense) /100
 [ -mincross                yes | no ]
 [ -portcheck               yes | no ]
 [ -square                  yes | no ]
 [ -sheetsize               size ]                   A, B, C, D, E, F,
                                                     infinite/infinite
 [ -dumb                    yes | no ]
 [ -targetlib               library ]
 [ -masterlib               library ]
 [ -libraries               library_list ]
 [ -overwrite               yes | no ]
 [ -views                   views ]                  schematic, functional
 [ -schematicview           viewname ]
 [ -functionalview          viewname ]
