<REPORTSCANPATH 
"REPORT SCANPATH 

Reports the scan nets and scan chain order created by TROUTE SCANCHAIN.


Syntax

R*EPORT SCANPATH 
S*CANCHAIN scanChainName 	
[F*ILENAME outputFileName ] 	
[L*IMIT lineLimit ] 	
;


Arguments

S*CANCHAIN scanChainName 
Specifies the scanChain to be reported.

FILENAME outputFile
The name of the output file.

LIMIT lineLimit
Limits the number of report lines to write.


Description

REPORT SCANPATH generates a report file containing information about scan nets and scan chain order that was generated by TROUTE SCANCHAIN. The default report file name is ''scan.rpt.'' This report can be used for test vector mapping.


Example

REPORTS SCANPATH SCANCHAIN GA;

The following example shows a scan chain report.

#Design Name :   SCAN_LOGIC 
#Date :   21 May 1996 
#Time :   11:11:55 
# SCANCHAIN scanChain 
#   C comp O pin N net #the startof the path 
#   C comp I pin O pin N net ...#nodes in the path
#   C comp I pin  #the end ofthe path 
# END SCANCHAIN scanChain

SCANCHAIN G4 

C ABC O	L N N4SCAN_1
C /I$1/I$ 31I DO QN N4SCAN_2
C /I$1/I$30 I DO QBN NSINV 
C /I$1/I$1 I XO XBN G4SN
C /I$1/I$32 I DO QN N4SCAN_3 
C /I$1/I$5 I DO QN N4SCAN_4
C SC2  I PAD 
END SCANCHAIN G1 


Related Command

TROUTE SCANCHAIN synthesizes or resynthesizes the scan chain specified by SCANCHAIN.
"

	<Type QHELP>
	<Header "Report ScanPath Command Help">
<beginAutoGen "** Do not edit from here to the endAutoGen tag **" >
	<Tag ReportScanpath
		<Toolname gsEnsemble>
		<Version 5.0>
		<Title "Report Scanpath Form Help">
	>
<endAutoGen >
>
