<PROUTEADDCELL 
"PROUTE ADDCELL 

PROUTE ADDCELL adds distribution tie-off, endcap, or fill cells to an entire design or to a given area during special routing. The new cells have their pins assigned to the specified nets in the order you specify.

PROUTE ADDCELL is interchangeable with SROUTE ADDCELL. See SROUTE ADDCELL for information on this command.
"

	<Type QHELP>
	<Header "Proute Add Cell Command Help">
<beginAutoGen "** Do not edit from here to the endAutoGen tag **" >
	<Tag ProuteAddcell
		<Toolname gsEnsemble>
		<Version 5.0>
		<Title "Add Filler Cells Form Help">
	>
<endAutoGen >
>
