<MODIFYIOPIN 
"MODIFY IOPIN

Modifies an IO pin.


Syntax

MODIFY IOPIN 
[NAME <pin name>] 
[<location>]      
[TO <new location>] 
[LAYER <new layer>]      
[HEIGHT <new height>] 
[WIDTH <new width>] 
[SNAPOFF] 
[SPECIAL] 
[REGULAR]; 


Arguments

pin name     
Name of the pin to be modified;   

location     
Location of the pin to be modified. A coordinate.   

new location     
New location for the pin.   

new layer     
New layer for the pin.   

new width     
New width for the pin.   

new height     
New height for the pin.     

SNAPOFF     
Do not snap the pin location. See add IOPin for detail.   

SPECIAL 
Change from a regular pin into a special one.   

REGULAR 	
Change from a special pin into a regular one.   


Description   

To modify various attributes of an IO pin.


Environmental Variables (NA)



Example

MODIFY IOPIN NAME datapin0 TO (11100,11200) LAYER M2;


Related Command (NA)


"

	<Type QHELP>
	<Header "Modify Pin Command Help">
<beginAutoGen "** Do not edit from here to the endAutoGen tag **" >
	<Tag ModifyPin
		<Toolname gsEnsemble>
		<Version 5.0>
		<Title "Modify Pin Form Help">
	>
<endAutoGen >
>
