<CHANGESEGMENT 
"CHANGE SEGMENT

Changes the layer, width, or spacing of a ring segment.


Syntax

C*HANGE SE*GMENT 
<pnt> 
{ attrNameRegExpr <new value> }... ;


Arguments

<pnt> 
The location of ring segment to be changed.     

attrNameRegExpr 
Includes LAYER, WIDTH, and SPACING.


Description

The CHANGE command changes the L*AYER, W*IDTH, or S*PACING of a ring segment.
"

	<Type QHELP>
	<Header "Change Segement Command Help">
<beginAutoGen "** Do not edit from here to the endAutoGen tag **" >
<endAutoGen >
>
