Session Manager

Use
In this control module you can configure 's session manager.
Session management refers to 's ability to save the state of applications and windows when you log out of and restore them when you log back in.
The General section contains one setting:
Confirm logout 	 If this option is checked, when logging out will display a dialog asking for confirmation. In this dialog you can also choose whether you want to restore your current session when you login the next time.
You may choose one of three options on what should happen when you log into
Restore previous session when logging in 	If this option is checked, will save your current session's state when you logout. will restore your session on the next login, so you can continue to work with a desktop just like you left it.
Restore manually saved session 	Instead of restoring to the state it was when you logged out last, it will be restored to a specific state that you have saved manually.
Start with an empty session 	 If you choose this option, will never restore sessions that it has saved.
Finally, you can configure what should happen by default when you log out of . These options are not possible on all operating systems, and they require the use of as your login manager.
The options available are self explanatory, if you are in doubt, leave the default setting. They are:
Login as different user (this is the default)
Turn off computer
Restart computer

Section Author
This section written by: Jost Schenck jost@schenck.de