0.5

0.55

0.6

0.65

-20 -15 -10 -5 -20

-15

-10

-5

log_2(lambda_{pi}) log2(lambda s)

CKL

0.5

0.55

0.6

0.65

-20 -15 -10 -5 -20

-15

-10

-5

log_2(lambda_{pi})

GACV

-20 -10 0 -20 -10 0 0.4 0.5 0.6 0.7

log_2(lambda_{pi}) log_2(lambda_s)

CKL

-20 -10 0 -20 -10 0 0.4 0.5 0.6 0.7

log_2(lambda_{pi}) log_2(lambda_s)

GACV